121314151617Dec.(197)24026028030bias[A^{DU]} 01020304050TEC[^{°C]}HBSBiasFluctuationDec.12,197-[2:9,2:9]biasTECDec.16,197.H.AKitaya01020304050TEC[_°C]26028030_{bias[ADU](2:9,2:9}ave.) TEC-BiasRelation(Dec.12,197-)y=ax3+bx2+cx+da=(2.5±0.6)×10-3b=-0.36±0.04c=21±1d=2513_±8gain:8_×8ofset:170Dec.16,197.H.Akitaya