0204060ADU(HalogenLamp)0501^×105σ2 Count-^σRelation(HBSCryocam1)Data:Feb.28,198.gain:1×8,bining:1×1^{σ 2=g×}Count+^{σ readout2+(ε}x)2g=1.17^±0.03sreadout=36.6^±4.1 ^ε=0.0^±0.02x=50:y={1-10};10pixels50framesMar.15,198.H.AKitaya0204060ADU(HalogenLamp)02_×1054_×1056×105_{σ2} Count-σRelation(HBSCryocam1)Data:Feb.28,198.gain:8_×8,bining:1_×1σ 2=g×Count+σ readout2+(εx)2g=8.4_±0.2sreadout=65_±17 _ε=(1.6_±1.3)_×10-3x=50:y={1-10};10pixels50framesMar.15,198.H.AKitaya