P olarimetric Standards Unp olarized Standards No. ep o ch R.A. Dec. m v ( � ) B-V( � ) U-B( � ) Sp c. p v ( � ) Dis.( � ) HD No. Name MCP U00001 2000 00 h 09 m 10 s : 6 +59 � 08 0 59 00 2.27(.008) 0.34(.005) 0.10(.012) F2 I I I 0.0009(.0029) 16.70(.158) 432 � Cas 101001 U00002 2000 06 h 37 m 42 s : 7 +16 � 23 0 57 00 1.93(.011) 0.00(.005) 0.06(.035) A0 IV 0.0022(.0060) 32.13(2.60) 47105 Gem { U00003 2000 11 h 01 m 50 s : 4 +56 � 22 0 56 00 2.37(.009) -0.02(.006) 0.00(.009) A1 V 0.0018(.0044) 24.35(.361) 95418 � UMa { U00004 2000 14 h 32 m 04 s : 6 +38 � 18 0 29 00 3.04(.013) 0.19(.006) 0.12(.012) A7 I I I 0.0012(.0050) 26.12(.501) 127762 Bo o { U00005 2000 22 h 41 m 27 s : 6 +10 � 49 0 53 00 3.41(.009) -0.09(.008) -0.22(.039) B8 V 0.0021(.0076) 63.94(3.22) 214923 � Peg { U00101 2000 03 h 30 m 00 s : 2 +55 � 27 0 07 00 5.10(.012) 0.04(.004) 0.04(.003) A1 IV 0.051 (0.020) 58.58(2.47) 21447 { { U00201 2000 01 h 33 m 15 s : 9 � 24 � 10 0 40 00 6.96(.003) 0.74(.005) 0.33(.005) G8 V ||| 19.50(.341) 9540 100021 U00202 2000 01 h 42 m 29 s : 7 +20 � 16 0 07 00 5.24(.012) 0.84(.008) 0.50(.011) K1 V 0.016 ( { ) 7.468(.051) 10476 107 Psc 101002 U00203 2000 03 h 02 m 26 s : 0 +26 � 36 0 34 00 6.62(.022) 0.72(.000) 0.31( |) G6 V ||| 21.16(.406) 18803 { 100023 U00204 2000 03 h 19 m 21 s : 6 +03 � 22 0 13 00 4.83(.011) 0.68(.006) 0.19(.008) G5 V 0.006 ( { ) 9.159(.065) 20630 � Cet 101003 U00205 2000 05 h 44 m 27 s : 7 � 22 � 26 0 55 00 3.59(.011) 0.48(.011) -0.01(.012) F6 V 0.005 ( { ) 8.969(.049) 38393 LepA 101004 U00206 2000 05 h 54 m 22 s : 9 +20 � 16 0 34 00 4.40(.010) 0.59(.009) 0.06(.012) G0 V 0.013 ( { ) 8.663(.081) 39587 � 1 Ori 101005 U00207 2000 06 h 13 m 12 s : 6 +10 � 37 0 39 00 6.44(.014) 0.66(.015) 0.16(.000) G6 V ||| 18.12(.321) 42807 { 100024 U00208 2000 07 h 39 m 18 s : 1 +05 � 13 0 30 00 0.37(.009) 0.42(.008) 0.02(.017) F5 IV 0.005 ( { ) 3.497(.011) 61421 � CMi 101007 U00209 2000 08 h 00 m 32 s : 2 +29 � 12 0 44 00 7.00(.016) 0.71(.011) 0.18(.009) G8 V ||| 16.80(.220) 65583 { 100025 U00210 2000 11 h 18 m 21 s : 9 � 05 � 04 0 02 00 7.29(.011) 0.74(.007) 0.27(.016) G8 V ||| 21.99(.494) 98281 { 100027 U00211 2000 11 h 34 m 29 s : 4 � 32 � 49 0 53 00 5.95(.007) 0.81(.007) 0.34(.015) K0 V 0.016 ( { ) 9.538(.074) 100623 { 101008 U00212 2000 11 h 47 m 15 s : 6 � 30 � 17 0 12 00 6.48(.004) 0.68(.000) 0.22(.027) G5 V ||| 17.77(.247) 102438 { 100028 U00213 2000 11 h 50 m 41 s : 6 +01 � 45 0 53 00 3.61(.009) 0.55(.008) 0.10(.011) F8 V 0.017 ( { ) 10.90(.092) 102870 � Vir 101009 U00214 2000 11 h 52 m 58 s : 7 +37 � 43 0 03 00 6.45(.008) 0.75(.007) 0.17(.011) G8 VI ||| 9.157(.065) 103095 CF UMa 100029 U00215 2000 13 h 11 m 52 s : 3 +27 � 52 0 41 00 4.26(.014) 0.57(.006) 0.07(.011) G0 V 0.018 ( { ) 9.155(.061) 114710 � Com 101010 U00216 2000 13 h 18 m 24 s : 2 � 18 � 18 0 41 00 4.74(.008) 0.71(.007) 0.26(.011) G6 V 0.010 ( { ) 8.525(.052) 115617 61 Vir 101010 U00217 2000 14 h 18 m 00 s : 5 � 07 � 32 0 33 00 6.47(.008) 0.72(.004) 0.34(.005) G8 V ||| 32.82(1.11) 125184 { 100030 U00218 2000 15 h 52 m 40 s : 4 +42 � 27 0 05 00 4.62(.015) 0.56(.012) 0.01(.015) F9 V 0.012 ( { ) 15.85(.137) 142373 � Her 101012 U00219 2000 16 h 04 m 03 s : 6 +25 � 15 0 16 00 7.10(.021) 0.77(.000) 0.34(.021) G8 V ||| 21.48(.419) 144287 { 100031 U00220 2000 16 h 04 m 56 s : 7 +39 � 09 0 23 00 6.66(.013) 0.73(.004) 0.21(.008) G8 V ||| 14.37(.119) 144579 { 100032 U00221 2000 17 h 02 m 36 s : 2 +47 � 04 0 54 00 6.76(.012) 0.73(.005) 0.28(.016) G8 V ||| 18.06(.181) 154345 { 100033 1

No. ep o ch R.A. Dec. m v ( � ) B-V( � ) U-B( � ) Sp c. p v ( � ) Dis.(p c) HD No. Name MCP U00222 2000 17 h 15 m 20 s : 7 � 26 � 36 0 04 00 4.32(.015) 0.86(.007) 0.49(.017) K1 V 0.005 ( { ) 5.985(.039) 155886 36 OphAB 100013 U00223 2000 18 h 07 m 01 s : 3 +30 � 33 0 43 00 5.05(.012) 0.52(.009) -0.09(.014) F7 V 0.002 ( { ) 15.65(.136) 165908 99 HerAB 100014 U00224 2000 19 h 36 m 26 s : 2 +50 � 13 0 16 00 4.48(.015) 0.38(.008) -0.03(.007) F4 V 0.003 ( { ) 18.59(.164) 185395 � Cyg 101015 U00225 2000 19 h 55 m 18 s : 5 +06 � 24 0 24 00 3.72(.011) 0.85(.006) 0.49(.010) G8 IV 0.012 ( { ) 13.71(.158) 188512 � Aql 101016 U00226 2000 20 h 45 m 17 s : 2 +61 � 50 0 20 00 3.42(.012) 0.92(.006) 0.61(.010) K0 IV 0.006 ( { ) 14.34(.101) 198149 � Cep 101017 U00227 2000 22 h 07 m 00 s : 5 +25 � 20 0 42 00 3.77(.006) 0.43(.007) -0.02(.012) F5 V 0.002 ( { ) 11.76(.099) 210027 � Peg 101019 U00228 2000 22 h 57 m 38 s : 9 � 29 � 37 0 20 00 1.16(.005) 0.09(.005) 0.10(.037) A3 V 0.006 ( { ) 7.688(.055) 216956 � PsA 101020 Strong Polarized Standards No. ep o c h R.A. Dec. m v ( � ) B-V( � ) U-B( � ) Sp c. p ( � ) P .A.( � ) Dis.(p c) HD No. Name MCP S10001 2000 01 h 20 m 04 s : 8 +58 � 13 0 54 00 4.99(.016) 0.68(.007) 0.47(.028) F0 Ia 3.32v(0.04) 92.1(0.2) 2.9k s 7927 � Cas 111001 S10002 2000 03 h 14 m 05 s : 3 +59 � 33 0 49 00 7.11(.010) 0.51(.014) -0.50(.010) O9 IV 4.82v(0.03) 115.1(0.3) 1.6k s 19820 CC Cas { S10003 2000 04 h 06 m 08 s : 0 +62 � 06 0 07 00 6.74(.027) 0.31(.015) -0.62(.016) B0.5 I I I 5.15v(0.03) 135.1(0.2) ? 25443 { { S10004 2000 17 h 05 m 32 s : 1 � 00 � 53 0 32 00 5.62(.010) 0.14(.020) -0.64(.015) B1 V 3.67v(0.05) 88.6(0.7) 410 s 154445 BS6353 110010 S10005 2000 17 h 43 m 46 s : 9 � 07 � 04 0 46 00 6.31(.016) 0.37(.008) -0.48(.026) B1.5 V 4.00v(0.01) 66.3(0.3) 310 s 161056 BS6601 { S10006 2000 21 h 28 m 57 s : 7 +58 � 44 0 23 00 7.94(.021) 0.81(.015) -0.13(.013) B0 V 5.34v(0.02) 58.7(0.4) 610 s 204827 { 110015 S10101 2000 04 h 02 m 55 s : 2 +62 � 25 0 17 00 7.30(.024) 0.33(.017) -0.55(.018) B0.5 I I I 5.70m( { ) 135 ( { ) 240mx 25090 { { S10102 2000 04 h 07 m 51 s : 0 +62 � 19 0 48 00 7.00(.031) 0.42(.019) -0.53(.008) B0 I In 6.31m( { ) 141 ( { ) 1.6k s 25638 SZ Cam { S10103 2000 16 h 20 m 38 s : 0 � 24 � 10 0 10 00 4.55(.017) 0.84(.006) 0.64(.046) A5 I I 4.48m( { ) 30 ( { ) 92 s 147084 o Sco 111009 S10104 2000 16 h 25 m 24 s : 1 � 23 � 27 0 38 00 6.74(.006) 0.30(.012) -0.35(.006) B3/4 V 3.51m( { ) 54 ( { ) 230 s 147888 � Oph D { S10105 2000 16 h 25 m 34 s : 9 � 23 � 26 0 46 00 4.66(.017) 0.23(.006) -0.57(.011) B2 IV 2.71m( { ) 49 ( { ) 230 s 147933 � Oph AB { S10106 2000 20 h 43 m 13 s : 4 +57 � 06 0 51 00 6.31(.005) 0.34(.005) -0.47(.004) B2 I I I 3.88m( { ) 131 ( { ) 360 s 197770 { { S10201 2000 03 h 29 m 04 s : 1 +59 � 56 0 25 00 4.21(.019) 0.41(.008) -0.23(.009) B9 Ia 3.5m ( { ) 115 ( { ) 1.1k s 21291 2H(CS) Cam 110003 S10202 2000 03 h 46 m 34 s : 2 +23 � 37 0 27 00 8.11(.016) 0.36(.005) 0.29(.010) A0 V 2.3m ( { ) 30 ( { ) ? 23512 { 110004 S10203 2000 06 h 16 m 58 s : 7 +23 � 44 0 27 00 6.25(.009) 0.45(.004) -0.38(.013) B3 Ia 3.0m ( { ) 170 ( { ) 1.4k s 43384 9(PX) Gem 110005 S10204 2000 17 h 41 m 58 s : 8 � 33 � 30 0 12 00 6.57(.036) 1.22(.015) 0.36(.098) A2 Ia+ 7.3m ( { ) 20 ( { ) 1.5k s 160529 V905 Sco 110011 S10205 2000 19 h 27 m 26 s : 3 +18 � 17 0 45 00 6.84(.017) 1.18(.018) 0.17(.031) B7 Ia 6.1m ( { ) 0 ( { ) 1.2k s 183143 HT Sge 110012 S10206 2000 19 h 52 m 28 s : 1 +01 � 00 0 20 00 3.68(.142) 0.71(.124) 0.47(.052) F6 Ia 1.8m ( { ) 93 ( { ) 440 s 187929 � Aql 111013 S10207 2000 20 h 48 m 56 s : 2 +46 � 06 0 51 00 4.83(.014) 0.40(.009) -0.46(.006) B3 Ia 2.8m ( { ) 3 ( { ) 1.0k s 198478 55(V1661) Cyg 111014 2